/* SYSTEM_CALL (<syscall name> [, <syscall alias>]) */

SYSTEM_CALL (fopen)
SYSTEM_CALL (fdopen)
SYSTEM_CALL (fclose)
SYSTEM_CALL (printf)
SYSTEM_CALL (vprintf)
SYSTEM_CALL (fprintf)
SYSTEM_CALL (vfprintf)
SYSTEM_CALL (fputc, putc)
SYSTEM_CALL (fputs)
SYSTEM_CALL (puts)
SYSTEM_CALL (fflush)
SYSTEM_CALL (fgetc, getc)
SYSTEM_CALL (ungetc)
SYSTEM_CALL (fgets)
SYSTEM_CALL (feof)
SYSTEM_CALL (ferror)
SYSTEM_CALL (fileno)
SYSTEM_CALL (freopen)
SYSTEM_CALL (clearerr)
SYSTEM_CALL (fread)
SYSTEM_CALL (fwrite)
SYSTEM_CALL (rename)
SYSTEM_CALL (sprintf)
SYSTEM_CALL (vsprintf)
SYSTEM_CALL (snprintf)
SYSTEM_CALL (vsnprintf)
SYSTEM_CALL (scanf)
SYSTEM_CALL (vscanf)
SYSTEM_CALL (fscanf)
SYSTEM_CALL (vfscanf)
SYSTEM_CALL (sscanf)
SYSTEM_CALL (vsscanf)
SYSTEM_CALL (fseek)
SYSTEM_CALL (ftell)
SYSTEM_CALL (rewind)
SYSTEM_CALL (fgetpos)
SYSTEM_CALL (fsetpos)
SYSTEM_CALL (remove)
SYSTEM_CALL (setbuf)
SYSTEM_CALL (setlinebuf)
SYSTEM_CALL (setvbuf)
SYSTEM_CALL (__vcformat)
SYSTEM_CALL (__vcscan)
SYSTEM_CALL (access)
SYSTEM_CALL (close)
SYSTEM_CALL (dup)
SYSTEM_CALL (dup2)
SYSTEM_CALL (getcwd)
SYSTEM_CALL (isatty)
SYSTEM_CALL (lseek)
SYSTEM_CALL (read)
SYSTEM_CALL (truncate)
SYSTEM_CALL (unlink)
SYSTEM_CALL (write)
SYSTEM_CALL (open)
SYSTEM_CALL (creat)
SYSTEM_CALL (utime)
SYSTEM_CALL (abs)
SYSTEM_CALL (labs)
SYSTEM_CALL (atof)
SYSTEM_CALL (atoi)
SYSTEM_CALL (atol)
SYSTEM_CALL (strtol)
SYSTEM_CALL (strtoul)
SYSTEM_CALL (strtod)
SYSTEM_CALL (rand)
SYSTEM_CALL (srand)
SYSTEM_CALL (drand48)
SYSTEM_CALL (erand48)
SYSTEM_CALL (lrand48)
SYSTEM_CALL (nrand48)
SYSTEM_CALL (mrand48)
SYSTEM_CALL (jrand48)
SYSTEM_CALL (srand48)
SYSTEM_CALL (seed48)
SYSTEM_CALL (lcong48)
SYSTEM_CALL (random)
SYSTEM_CALL (srandom)
SYSTEM_CALL (initstate)
SYSTEM_CALL (setstate)
SYSTEM_CALL (qsort)
SYSTEM_CALL (bsearch)
SYSTEM_CALL (malloc)
SYSTEM_CALL (calloc)
SYSTEM_CALL (realloc)
SYSTEM_CALL (free)
SYSTEM_CALL (getenv)
SYSTEM_CALL (setenv)
SYSTEM_CALL (putenv)
SYSTEM_CALL (mktemp)
SYSTEM_CALL (system)
SYSTEM_CALL (gcvt)
SYSTEM_CALL (mkdir)
SYSTEM_CALL (stat)
SYSTEM_CALL (fstat)
SYSTEM_CALL (opendir)
SYSTEM_CALL (readdir)
SYSTEM_CALL (rewinddir)
SYSTEM_CALL (closedir)
SYSTEM_CALL (telldir)
SYSTEM_CALL (seekdir)
SYSTEM_CALL (gettimeofday)
SYSTEM_CALL (utimes)
SYSTEM_CALL (arosc_internalinit)
SYSTEM_CALL (arosc_internalexit)
SYSTEM_CALL (strftime)
SYSTEM_CALL (strerror)
SYSTEM_CALL (exit)
SYSTEM_CALL (abort)
SYSTEM_CALL (chmod)
SYSTEM_CALL (localtime)
SYSTEM_CALL (time)
SYSTEM_CALL (gmtime)
SYSTEM_CALL (perror)
SYSTEM_CALL (ctime)
SYSTEM_CALL (clock)
SYSTEM_CALL (atexit)
SYSTEM_CALL (pipe)
SYSTEM_CALL (fcntl)
SYSTEM_CALL (difftime)
SYSTEM_CALL (ftruncate)
SYSTEM_CALL (umask)
SYSTEM_CALL (unsetenv)
SYSTEM_CALL (asctime)
SYSTEM_CALL (sleep)
SYSTEM_CALL (chdir)
SYSTEM_CALL (IoErr2errno)
SYSTEM_CALL (mktime)
SYSTEM_CALL (div)
SYSTEM_CALL (ldiv)
SYSTEM_CALL (sigaction)
SYSTEM_CALL (sigaddset)
SYSTEM_CALL (sigemptyset)
SYSTEM_CALL (fchmod)
SYSTEM_CALL (sigdelset)
SYSTEM_CALL (sigfillset)
SYSTEM_CALL (sigismember)
SYSTEM_CALL (sigpending)
SYSTEM_CALL (sigprocmask)
SYSTEM_CALL (sigsuspend)
SYSTEM_CALL (tmpnam)
SYSTEM_CALL (updatestdio)
SYSTEM_CALL (__assert)
SYSTEM_CALL (lldiv)
SYSTEM_CALL (strtoll)
SYSTEM_CALL (strtoull)
SYSTEM_CALL (on_exit)
SYSTEM_CALL (getpid)
SYSTEM_CALL (popen)
SYSTEM_CALL (stcd_l)
SYSTEM_CALL (stch_l)
SYSTEM_CALL (stcl_d)
SYSTEM_CALL (stcl_h)
SYSTEM_CALL (stcl_o)
SYSTEM_CALL (stco_l)
SYSTEM_CALL (realloc_nocopy)
SYSTEM_CALL (getfsstat)
SYSTEM_CALL (signal)
SYSTEM_CALL (_exit)
SYSTEM_CALL (kill)
SYSTEM_CALL (setlocale)
SYSTEM_CALL (pclose)
SYSTEM_CALL (mkstemp)
SYSTEM_CALL (execvp)
SYSTEM_CALL (rmdir)
SYSTEM_CALL (getuid)
SYSTEM_CALL (geteuid)
SYSTEM_CALL (__get_arosc_userdata)
SYSTEM_CALL (__arosc_nixmain)
SYSTEM_CALL (spawnv)
SYSTEM_CALL (chown)
SYSTEM_CALL (spawnvp)
SYSTEM_CALL (readlink)
SYSTEM_CALL (getpwuid)
SYSTEM_CALL (getgrgid)
SYSTEM_CALL (getgid)
SYSTEM_CALL (getegid)
SYSTEM_CALL (getpwnam)
SYSTEM_CALL (setpwent)
SYSTEM_CALL (getpwent)
SYSTEM_CALL (endpwent)
SYSTEM_CALL (getgroups)
SYSTEM_CALL (getgrnam)
SYSTEM_CALL (endgrent)
SYSTEM_CALL (getgrent)
SYSTEM_CALL (setgrent)
SYSTEM_CALL (fchown)
SYSTEM_CALL (fsync)
SYSTEM_CALL (link)
SYSTEM_CALL (symlink)
SYSTEM_CALL (mknod)
SYSTEM_CALL (getppid)
SYSTEM_CALL (execl)
SYSTEM_CALL (getpgrp)
SYSTEM_CALL (ioctl)
SYSTEM_CALL (wait)
SYSTEM_CALL (setuid)
SYSTEM_CALL (setgid)
SYSTEM_CALL (getw)
SYSTEM_CALL (putw)
SYSTEM_CALL (getloadavg)
SYSTEM_CALL (raise)
SYSTEM_CALL (times)
SYSTEM_CALL (ftime)
SYSTEM_CALL (strsep)
SYSTEM_CALL (tempnam)
SYSTEM_CALL (tmpfile)
