%% -*- mode: LaTeX -*-
%%
%% Copyright (c) 1999 The University of Utah and the Computer Systems
%% Laboratory at the University of Utah (CSL).
%%
%% This file is part of Flick, the Flexible IDL Compiler Kit.
%%
%% Flick is free software; you can redistribute it and/or modify it under the
%% terms of the GNU General Public License as published by the Free Software
%% Foundation; either version 2 of the License, or (at your option) any later
%% version.
%%
%% Flick is distributed in the hope that it will be useful, but WITHOUT ANY
%% WARRANTY; without even the implied warranty of MERCHANTABILITY or FITNESS
%% FOR A PARTICULAR PURPOSE.  See the GNU General Public License for more
%% details.
%%
%% You should have received a copy of the GNU General Public License along with
%% Flick; see the file COPYING.  If not, write to the Free Software Foundation,
%% 59 Temple Place #330, Boston, MA 02111, USA.
%%

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%% This file defines the body of the Flick Programmer's Manual.  This file is
%% input by one of the LaTeX ``root files'' for the manual.

\maketitle

\tableofcontents

\part{Introduction}
\label{part:Introduction}
\input{abstract}
\input{introduction}
\input{coding}

\part{The Intermediate Representations}
\label{part:The Intermediate Representations}
\input{meta}
\input{aoi}
\input{mint}
\input{cast}
\input{pres-c}
\input{scml}

\part{The Programs and Libraries}
\label{part:The Programs and Libraries}
% \input{flick-desc}
\input{libcompiler}
\input{fe}
\input{pg}
% \input{pdl}
\input{pbe}
% \input{notes-nathan}
\input{runtime}

% \bibliography{sys}
% \bibliographystyle{abbrv}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%% End of file.

