%% -*- mode: LaTeX -*-
%%
%% Copyright (c) 1999 The University of Utah and the Computer Systems
%% Laboratory at the University of Utah (CSL).
%%
%% This file is part of Flick, the Flexible IDL Compiler Kit.
%%
%% Flick is free software; you can redistribute it and/or modify it under the
%% terms of the GNU General Public License as published by the Free Software
%% Foundation; either version 2 of the License, or (at your option) any later
%% version.
%%
%% Flick is distributed in the hope that it will be useful, but WITHOUT ANY
%% WARRANTY; without even the implied warranty of MERCHANTABILITY or FITNESS
%% FOR A PARTICULAR PURPOSE.  See the GNU General Public License for more
%% details.
%%
%% You should have received a copy of the GNU General Public License along with
%% Flick; see the file COPYING.  If not, write to the Free Software Foundation,
%% 59 Temple Place #330, Boston, MA 02111, USA.
%%

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%% This file is the ``root file'' for the printed (PostScript) version of the
%% Flick Programmer's Manual.
%%
\documentclass[11pt]{book}

\input{guts-decls}
\input{guts-commands}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\begin{document}
\input{guts-body}
\end{document}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%% End of file.

